Bari RPC: cluster size distribution with 1.5 cm strips

0 0.5 1 1.5 2 2.5 3 3.5 4

0 200 400 600 800 1000 1200 1400 flux (Hz/cm2) average cluster size

0 0.5 1 1.5 2 2.5 3 3.5 4

13.7 13.8 13.9 14 14.1 14.2 14.3 14.4 14.5 14.6 kV average cluster size