0 20 40 60 80 100

0 0.2 0.4 0.6 0.8 1 1.2 η

RPC trigger acceptance (%)

1 TeV μ

MS1,1’,2,2’ solid line: good ϕ dashed line: all ϕ

0 20 40 60 80 100

0 0.2 0.4 0.6 0.8 1 1.2 η

RPC trigger acceptance (%)

1 TeV μ

MS1,2,3,4 solid line: good ϕ dashed line: all ϕ

Gaps between the wheels ...

dramatically affect trigger acceptance at low p_t !