trig. lumi. TP recent guess 2μ high 10 GeV <1 kHz 6 GeV a few kHz

• in the past no b-physics considered at high luminosity ⇒ 10 GeV cut with <1 kHz rate was enough for Z→μμ • now some channel may require lower cuts, e.g.:

� Β^0_s → μμ (directly, by FCNC) � SUSY particle searches

� more bandwidth might be needed for this trigger

trig. lumi. TP recent guess 2μ low <4.3 GeV <1 kHz <3.6 GeV a few kHz

• making profit on 2a (lowering the threshold) • and taking into account 2b and 3bc • DT/CSC (4) cannot help much

� one can expect significantly higher trigger rate