trig. lumi. TP recent guess

1μ high 20 GeV 6 kHz 15 GeV 6 kHz

• prompt μ dominates, new prompt μ rate is 5 times lower • ~2 times lower trigger rates

⇒ 3 kHz @ 20 GeV or rather 6 kHz @ 15 GeV

� some gain in τ→μ trigger

trig. lumi. TP recent guess

1μ low 8 GeV 4 kHz 6 GeV 6-10 kHz

• Β → ππ requires low p_t cut on tagging μ • 2c makes possible ~6 GeV with <10 kHz (~15 kHz before) • new Pythia reduce it further to 5-6 kHz • 2b and 3bc can slightly increase it again • DT/CSC (4) may help a little

� significant gain in Β → ππ