Muon reconstruction

all events 99.4 % dp/p = 0.25

2 stations 16.8 % dp/p = 0.57

3 stations 25.7 % dp/p = 0.27

4 stations 56.8 % dp/p = 0.23

Pattern recognition and momentum fit (no vertex constraint) Kalman Filter based method by Padova (CMS TN/94-298) not finally optimised yet - results can be further improved 200 GeV muons + secondaries