10^2

10^3

10^4

10^5

1 10 10^2 p_t^{cut} ΜGeVΝ rate ΜHzΝ

L=10^{33} |η|Λ2.5

|η|Λ1.5 single μ

|η|Λ2.5 double μ

5000 Hz

2500 Hz

470 Hz

CMS Muon Trigger

Single and double muon rates