G.Wrochna 2.09.1993

PARAMETRIZATION OF MUON TRIGGER EFFICIENCY

Fortran (REAL) function:

EFFMUTR (PTCUT, ETA, PT)

Parameters:

PTCUT - user defined ptcut ETA, PT - η and p_t of the particle

Restrictions:

EFFMUTR (..., ETA, ...) = EFFMUTR (..., -ETA, ...) EFFMUTR (..., ETA>2.5, ...) = 0 PT>0 Lowest possible PTCUT values:

4.3 GeV at |η|<1.5 3.4 GeV at 1.5<|η|<2.0 2.4 GeV at 2.0<|η|<2.5 In case you give lower PTCUT value, one of the above will be taken.