0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

1 10 10^2 efficiency

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

1 10 10^2

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

1 10 10^2 p_t ΜGeVΝ 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

1 10 10^2 p_t ΜGeVΝ

CMS Muon Trigger

Efficiency curves

|η|<0.8 0.8<|η|<1.5

1.5<|η|<2.0 2.0<|η|<2.5