95/06/01 08.23

0.5 0.6 0.7 0.8 0.9 1

10 10^2 p_t [GeV] efficiency

STRONG 3/4 ALGORITHM

10^{-3}

10^{-2}

10^{-1} 1

10 10^2

0.5 0.6 0.7 0.8 0.9 1

10 10^2

WEAK 3/4 ALGORITHM

10^{-3}

10^{-2}

10^{-1} 1

10 10^2

0.5 0.6 0.7 0.8 0.9 1

10 10^2

4/4 ALGORITHM

10^{-3}

10^{-2}

10^{-1} 1

10 10^2