Charged particle rates in CMS

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 10 10^2

10^3

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5 η

Hz/cm^2

MS 1 MF 1

Total rate Punchthrough K, π decays Prompt μ 1

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 10 10^2

10^3

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5 η

Hz/cm^2

MS 4 MF 4

Total rate Punchthrough K, π decays Prompt μ 1