RPC Trigger Test Stand in Warsaw

An RPC trigger stand is being build in Warsaw. It will contain the full muon trigger logic chain, simulating 1/12 of one iron wheel.

Input data:

- random hits, - hits from CMS simulation, - hits from cosmic RPC telescope.

Items to be developed / trained / tested:

- trigger logic, - timing (including autocalibration), - loading of patterns, - boundary scan, - 0-suppression scheme, - readout, - monitoring.