"Declustering" algorithm

Cluster center may not be a good estimate of muon position in case of overlaped clusters e.g. from muon and delta.

declustering algorithm "N-2" : # PACT processor input channels = # RPC strips

RPC:   ---X----   ---XX---   --XXX---   --XXXX--  ...  N>2
PACT:  ···*····   ···*····   ···*····   ···**···  ...  N-2

declustering algorithm "2N-5": # PACT processor input channels = 2 x # RPC strips

 - - - - X - - - -     - - - X X - - - -     - - - X X X - - -
 ········*········     ·······*·········     ········*········
     - - X X X X - - -     - - X X X X X - -   ...   N>2
     ······***········     ······*****······   ...   2N-5

δ μ error center

RPC strips