mu-strip distance (cm)

Performance of ’’declustering’’

0 500 1000

1500

0 2 4 6

Entries 5455

mu-strip distance (cm) 0 100 200 300 400

0 2 4 6

Entries 2710

mu-strip distance (cm) 0 200 400 600 800

0 2 4 6

Entries 3150

mu-strip distance (cm) 0 200 400 600 800

0 2 4 6

Entries 5491

mu-strip distance (cm) 0 500 1000

0 2 4 6

Entries 5023

mu-strip distance (cm) 0 200 400

0 2 4 6

Entries 3059

mu-strip distance (cm) 0 200 400 600

0 2 4 6

Entries 2661

mu-strip distance (cm) 0 200 400 600 800

0 2 4 6

Entries 5094

2x1 cm strips 2x2 cm strips

10 GeV small clusters

10 GeV big clusters

1000 GeV small clusters

1000 GeV big clusters