RPC single strip width and cluster size

0 1 2 3 4 5

0 0.5 1 1.5 2 2.5 η strip width (cm)

0 1 2 3 4 5

0 0.5 1 1.5 2 2.5 η strip width (cm)

0 1 2 3 4 5

0 0.5 1 1.5 2 2.5 η

RPC cluster size

0 1 2 3 4 5

0 0.5 1 1.5 2 2.5 η

RPC cluster size

0 1 2 3 4 5

0 0.5 1 1.5 2 2.5 η

PACT cluster size

0 1 2 3 4 5

0 0.5 1 1.5 2 2.5 η

PACT cluster size

’’small’’ clusters ’’big’’ clusters