RPC clusters and trigger performance

Conclusions: • test beam data shows the cluster size of 3.5-6.5 cm, • simple logic is proposed to reduce the cluster size, • "declustering" do not introduce errors >1 strip, • 3.5 cm clusters do not affect trigger performance, • 6.5 cm clusters slightly reduce the purity of trigger cuts

for large η and high p_t.