TRIGGER VME BOARD

V M E I N T E R F A C E

18 20

24 30 t_0 clock tr.reject

18 + 20

24 + 30

9 8

ALTERA 7256

ALTERA 7256

TRIGGER PROCESSOR

ALTERA 7128

ALTERA 7128

ALTERA 7128