PPC Workshop CERN, 24.03.1994

MUON TRIGGER SOFTWARE

Grzegorz Wrochna

WROCHNA@CERNVM

CMS first level muon trigger based on dedicated detectors should be a common effort of PPC and RPC groups.

If possible, PPC and RPC should be connected to the common trigger logic and have the same readout.

Therefore also the trigger simulation should be a common project.

Participation of PPC Group is highly welcome especially in the following areas:

DIGITIZATION: - PPC specific detector response - description of chamber / cell / strip geometry

TRIGGER ALGORITHM: - detailed study of various possibilities

PHYSICS SIMULATION: - passing physics events (generated by Pythia, Isajet etc.)

through the trigger simulating program (CMSIM/MTRIG) in order to evaluate acceptances, level of background, trigger rates etc.