0 2 4 6 8 10 0

2

4

6

8 1.40

1.64 1.75 1.87 1.99

2.45

1.52

2.10 2.22 2.34

11 12 13 14 15 17 18 19

R [m]

Z [m]

4

16

0 1 5 7 0.30 0.79

1.16

1.06

0.09 0.46 0.64 0.93

2 3 6

1.24 1.32 8 9 10

0 2 4 6 8 10 0

2

4

6

8

0.44 0.56 0.67

1.28

1.40

1.64 1.75 1.87 1.99

2.45

1.52

2.10 2.22 2.34

12 13 14 15 16 17 19 20 21

R [m]

Z [m]

4 6

18

1 2 3 5 7 8 9 10 11

0.14 0.29 0.90

0.79 0.99 1.07

1.16

0.00

0 2 4 6 8 10 0

2

4

6

8

0.06 0.20 0.33 0.44 0.56 0.67 0.76 0.97

1.16

1.28

1.40

1.64 1.75 1.87 1.99

2.45

1.52

0.86 1.05

2.10 2.22 2.34

11 12 13 14 15 16 17 19 20 21

R [m]

Z [m]

1 0 2 3 4 5 6 7 10

18

9 8 Ref: 1/3 MS4

+ 98.5 % acceptance - many connections - low p_t ref.? - no match at η=0 + 37 + 6 rings + 1080 barrel RPC

Ref: 1/3 MS2

- ~92 % acceptance + less connections + low p_t O.K. - no match at η=0 + 33 + 6 rings + 1080 barrel RPC

Ref: 1/4 MS2

- ~92 % acceptance + less connections + low p_t O.K. + match at η=0 + 36 + 6 rings + 840 barrel RPC? • 1140 barrel RPC? - 1320 barrel RPC?