Pattern Comparator Trigger

Number of patterns grows rapidly at low p_t.

Goal: - keep it between 10 and 100.

Solution: - 2, 4 or 8 neighbouring strips are OR-ed.

1

10

10^2

10^3

1 10 10^2 p_t^{cut} (GeV)

number of patterns

|η|Λ 0.8 single strips

2-OR

4-OR