CMS Meeting at UCLA, G.Wrochna, Muon Trigger, page 1 0 June 18, 1994

Pattern Comparator

Two possibilities of implementation are investigated:

- commercial programmable devices (ALTERA, XILINX, etc.), the first prototype based on ALTERA 7000 has been already tested in lab and in the RD5 beam at CERN;

- custom VLSI circuits,

the first design under CADENCE is well advanced.

MS 4

MS 3

MS 2

MS 1

L A T C H E S

LATCHES

p_t coding