φ +1 neighbour η+1 neighbour

φ-1 neighbour η-1 neighbour

PACT Segment Processor

high p_t pattern comparator

low p_t pattern comparator

η_{OR} φ_{OR}

resynchr.

unit synchr .

resynchr.

unit

resynchr.

unit R P C

S E C T O R

D A Q pipeline & readout

timing & control JTAG bound. scan