CMS Muon Trigger History

1990 Dec. - LHC Workshop @ Aachen RPC proposed as a trigger device for CMS 1992 Apr. - 8th CMS Collaboration Meeting Drift Tubes trigger with meantimer proposed 1992 Oct. - CMS Letter of Intent

Cathode Strip Chambers proposed for MF1 1993 Dec. - 25th CMS Collaboration Meeting Cathode Strip Chambers also for MF2,3,4 1994 Jul. - CMS Endcap Meeting @ Wisconsin CSC Trigger Working Group appointed

Current activities

"center of gravity" RPC: ASIC’s design & testing (PACT and Sorter)

infrastructure (interconnections, monitoring)

DT: meantimer & correlator - prototyping

global track finder - conceptual design

CSC: b.x. determination - conceptual design

local tracks - conceptual design and simulation