In the letter to the spokesman of CMS dated 15.04.1993 the LHC Committee says:

"The committee appreciates the overall detector concept of CMS, in particular the importance the collaboration has attached to finding a robust muon system with a highly compact design. ... The muon system is a convincing design offering good momentum resolution and robust identification and triggering performance."