Complementarity of DT and RPC

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

10 10^2 efficiency

DT: MF1 meantimers with step = 1.25 mm sharp cut at high p_t

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

10 10^2

RPC: 4 planes of 2-4 cm strips good rejection of low p_t muons

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

10 10^2 p_t (GeV)

DT and RPC combination sharp cut everywhere

3 30