DT/CSCandRPC/PPCComplementarity

Both aspects of the complementarity: performance and safety, cannot be quantified / proven (yet) because (at the moment) they are based mainly on experience and risk weighing.

Therefore they can be easily questioned:

performance:

In principle DT/CSC system can be equipped with a logic which mimics the RPC/PPC granularity. Why do we need RPC/PPC then?

safety:

In principle all possible backgrounds should be properly simulated. Why do we talk about "surprises"?

Fortunately, whether we believe in the complementarity or not,

IT DOES NOT MATTER !

In both cases we should proceed in the same way,

i.e. check whether

"in principle" = "in practice"

in terms of

- technical feasibility - limited latency time - reasonable cost