Cathode Strip Chamber Trigger

After systematic study of requirements and possibilities the work (designing, simulation and experimental tests) will now concentrate on algorithms for:

- b. x. assignment

(2nd hit confirmed by 4/6 coincidence) - 1/2 strip resolution (net of comparators) - Local Charge Track logic - especially at low p_t - matching space and time information - multitrack events - suppressing η / φ ghosts - combining information from several stations - p_t determination