PROGRAM FLOW

Every GEANT user routine

GUxxxx or UGxxxx

calls corresponding subdetector routines

Xxxxx,

where X=C,T,E,H,M,F,CU

(Cms, Tracking, Ecal, Hcal, Muons, Fcal and CmsUser)

Then routines for specific studies are called according to FLOW card parameters, e.g.

GUSTEP → MSTEP → MHITS (IMFLOW=1) MFHITS (IMFLOW=2) MTHITS (IMFLOW=3)

Routines CUxxxx (e.g.CUSTEP) are left empty for individual users.