CMS Muon Group Meeting, 14.07.1993

Status of the muon software

Grzegorz Wrochna

WROCHNA@CERNVM

Main changes due to new card FLOW:

FLOW ICFLOW ITFLOW IHFLOW IMFLOW IFFLOW

IMFLOW task

0 no action 1 standard banks MXYZ 2 momentum fit 3 trigger study