DEBUGGING

DEBU card selects range of events CBUG card define debugging level:

0 none 1 a few lines / event 2 ≈ one page / event 3 a few pages / event

MUON004 CMZ

directory description

MUGEOM geometry definition MFLOW flow controll MSTD standard banks MXYZ MGFIT interface to GEANE MUFIT momentum fit MTRIG trigger study MUDIGI digitization MUSUM superposition of crossings MUOUTI utilities