Full CMS Momentum Resolution

0 0.05 0.1 0.15 0.2 0.25

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

Δp_t/p_t p_t = 1000 GeV

0

0.02

0.04

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5 p_t = 100 GeV

LOI (v.10A) TP (v.13H)

0

0.005

0.01

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5 η p_t = 10 GeV