CMS Muon Group Meeting CERN, 19.09.94

Muon Momentum Resolution of the New CMS Layout

V. Karimaki, G. Wrochna

A new CMS layout incorporating the "US Proposal for Endcaps" has been proposed at the CMS Technical Board, 12.09.94.

Parameters used for the comparision with the LOI version:

# layers/station single layer resolution MS1-4 2x4 200 μ MF1 6 100 μ MF1A,B 6 200 μ MF2-4 6 200 μ