CMS Inner Tracker

Barrel Forward

MSGC Silicon MSGC Silicon

z [cm] z [cm] r [cm] r [cm]

*18 *117 *24 *123 123 *30 *129 36 *135 135 *62 150 150 69 *165 165 *76 *83 185 *205 *104 225 111 *245 *118 270 *125 *295 320 *345

* stage 1