0 0.5 1 1.5 2 2.5 3

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5 η

number of lost muons

0 5 10 15 20 25 30 35 40 45

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5 η

number of ghosts

Muon Matching

ORIGIN OF LOST MUONS AND GHOSTS:

χ^2 / NDF > 3.5

white: χ^2 / NDF < ∞ black: χ^2 / NDF < 3.5