Muon Matching

full line: "optimistic" detector dotted line: "pessimistic" detector

p_t^{jet} Γ 20 GeV

0 1 2 3 4 5 6 7 8 9 10

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 χ^2 / NDF cut

% of ghosts and lost muons lost muons

ghosts

p_t^{jet} Γ 1 TeV

0 1 2 3 4 5 6 7 8 9 10

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 χ^2 / NDF cut

% of ghosts and lost muons lost muons ghosts