Vertex constraint in CMS

10^{-3}

10^{-2}

10^{-1}

10 10^2 10^3

Δp/p

20 μm 30 μm 50 μm 100 μm 200 μm 500 μm 1000 μm muon system alone

full detector vertex precision:

p ΜGeV/cΝ