CMS Momentum Resolution

0 0.005

0.01

0.015

0.02

0.025

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

Δp/p vertex constraint no vertex

p = 50 GeV

0

0.005

0.01

0.015

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5 p = 10 GeV

0

0.005

0.01

0.015

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5 η p = 3 GeV