RD5 Experiment

Physics aspects of muon detection: - hadronic punchthrough - muon radiation Technical aspects of muon detection: - trigger algorithms - pattern recognition - muon momentum measurement Tests of muon detector prototypes: - Drift Tubes with Bunch-Crossing Identification Capability (DTBX) - Wall-Less Drift Chambers (WLDC) - Cathode Strip Chambers (CSC) - Honeycomb Strip Chambers (HSC) - Resistive Plate Chambers (RPC) - Parallel Plate Chambers (PPC) - Fire Fly Chambers (FFC)