Region accessible for LEP

500 m_A [GeV] tanβ

100 200 300 400

50

20

10

5

2

1 0

LEP, present limit LEP II, 190 GeV

m_{top}= 140 GeV

Probe M_H ≈ √s - M_Z - 10 GeV