Muon detection in CMS

- magnet (coil+yoke): curves charged tracks - muon stations: - muon identification - trigger - momentum measurement - calorimeters: filters other particles - inner tracking: improves momentum resolution

Advantages of the CMS muon system:

- 1 single magnet - 2 independent trigger systems - 3 different momentum measurements - 4 muon stations