CMS bending power

0 2 4 6 8 10 12 14

0 0.5 1 1.5 2 2.5 η

Ι B x dl ΜTmΝ inside the coil

outside the coil

0 5 10 15 20 25 30 35 40

0 0.5 1 1.5 2 2.5 η

R Ι B x dl ΜTm^2Ν inside the coil