Muon Induced Secondaries

1 TeV muon with a "catastrophic" energy loss of 22 GeV

5 cm air gap

4 x 1cm drift tubes

e μ γ

12 cm Al honeycomb iron yoke

5 cm air gap

4 x 1cm drift tubes

5 cm air gap iron yoke

12 cm Al honeycomb