100

200

300

400

500

HCAL

MAGNET

ECAL

MSGC SILICON

Infrastructure, DAQ, etc.

MUONS

0 1.3 1.4 1.5 1.6 1.7

COST [MSF]

R_{ECAL} [m]

CMS cost vs ECAL inner radius